Las lentes fotográficas. Segunda Parte

Por Fernando Osorio Alarcón

Las lentes u objetivos de ocho elementos y anastigmáticos, que aparecen en la última decada del siglo XIX, se basan en su diseño en "dobletes simétricos" compuestos por dos mitades convergentes que estan corregidas con mucha presición. Tal es su correción que estos objetivos pueden ser usados por separado si se desea. Al usarse por separado el objetivo se comporta como un objetivo de foco largo. Este tipo de lentes se llamaron "convertibles" y se componen de dos mitades diferentes e intercambiables y asi se tenia la óptica para tres distancias focales diferentes debidamente marcadas con su propia escala de números.

Los objetivos anastigmáticos simétricos son también apropiados para cubrir grandes campos angulares, ya que producen un efecto de viñeteado mínimo. El campo que cubren tiene un rango de 80 grados a 90 grados con una abertura máxima de f 6.3 ó f 8 [e.i Schenider Angulon]. Este tipo de lentes también se aplica a copiado y ampliaciónes de grandes formatos. Este diseño de caracteriza por contar con componentes iguales a cada lado del diafragma, como es el caso del Zeis Planar.

En Inglaterra, H. Dennis Taylor diseñó una lente complentamente diferente. Su diseño presentado en 1893 se llamó: "Cooke Triplet" y estaba fabricado con vídrio de bario. El principio de Taylor para corregir la curvatura de campo esta basado en combinar varias lentes positivas y negativas del mismo calibre. Con espacios de separación entre los elementos, Taylor logró que la lente positiva tuviera mayor resolución resultando un objetivo positivo. Taylor corrigió la distorsión de curvatura colocando la mitad de una lente positiva en ambos lados del sistema. Corrigió el astigmatismo colocando la lente negativa cerca del diafragma y el coma y la aberración esférica eligiendo la curvatura de las superficies. Pero Taylor, fue aún más lejos , encontró la formula para efectuar la corrección acromática a todo el conjunto o sistema y no a cada lente. Sus cálculos siempre fueron algebraícos y las ecuaciones desarrolladas por él mismo. Cuando decidia que ya había sufuciente teoria y matemáticas en su diseño, entonces enviaba éste al laboratorio para fabricar el prototipo en donde se corregia a base de ajustes y pruebas.

Los avances en este campo se debieron al uso de diferentes tipos de vídrios y a la aplicación de espacios de aire entre los elementos ópticos. Con un número mayor de elementos fabricados con diferentes tipos de vidrio se pudieron corregir las aberraciones que tanto hicieron sufrir a los diseñadores del siglo XIX. Así el siglo XX pudó contar con una experiencia en el diseño de objetivos para esperar las cámaras SRL [single refles lens] o tipo reflex y poder manejar formatos más pequeños en negativos. Las variantes de lentes llegaron hasta el diseño de tele-objetivos anastigmáticos fabricados a partir de 1920 cuya apertura era de f 5.6 y cuyos antecedentes se encuentran en 1890 con los tele objetivos de acoplamiento. Sin embargo, la aprición de la cámara reflex impuso un objetivo invertido y de distancia focal variable, Para 1950 la industria de la televisión y el cine obligó a la fabricación de este tipo de lentes.

Por último, y como la ciencia y la tecnología son ubicuas, el diseño de Petzval, pionero en la industria del daguerrotipo, se retomó para la fabricación de ópticas para proyectores. Aquí se requerian lentes de largo alcance, asi como en la fotografía de alta velocidad que requerian aberturas muy grandes para tiempos muy cortos de exposición. Nadie sabe para quien trabaja.

Bibliografía para su consulta:

Enciclopedia de la Fotografía (Historia del Objetivo), Ediciones Omega [Barcelona].

Brandt, H.M. The Photographic Lens. Focal Press [London] 1968.